ALTER DATABASE arizona SET EMERGENCY;
GO

ALTER DATABASE arizona set single_user
GO

DBCC CHECKDB (arizona, REPAIR_ALLOW_DATA_LOSS) WITH ALL_ERRORMSGS, NO_INFOMSGS;
GO 

ALTER DATABASE arizona set multi_user
GO

EXEC sp_configure filestream_access_level, 2;
RECONFIGURE;