USE [HCITools]
GO

IF  EXISTS (SELECT * FROM sys.objects WHERE object_id = OBJECT_ID(N'[dbo].[LabelsList]') AND type in (N'U'))
DROP TABLE [dbo].[LabelsList]
GO

SET ANSI_NULLS ON
GO

SET QUOTED_IDENTIFIER ON
GO

SET ANSI_PADDING ON
GO

IF NOT EXISTS (SELECT 1
                 FROM sys.objects o WITH (NOLOCK)
                 JOIN sys.schemas s WITH (NOLOCK) ON o.schema_id = s.schema_id
                WHERE o.name = 'LabelsList'
                  AND o.type IN (N'U')
                  AND s.name = 'dbo')
BEGIN

  CREATE TABLE [dbo].[LabelsList](
	  [LL_Name] [varchar](17) NULL
  ) ON [PRIMARY]

END
GO

SET ANSI_PADDING OFF
GO


