USE master; -- Ensure you are connected to the master database
GO

-- Retrieve the last full backup date for the specified database
SELECT top 10
    b.backup_start_date AS BackupDate,
    CASE
        WHEN b.type = 'D' THEN 'Full'
        WHEN b.type = 'L' THEN 'Log'
        ELSE 'Other'
    END AS BackupType
FROM msdb.dbo.backupset b
INNER JOIN (
    SELECT
        database_name,
        MAX(backup_start_date) AS last_backup_date
    FROM msdb.dbo.backupset
    WHERE database_name = 'arizona'
    GROUP BY database_name
) maxb ON b.database_name = maxb.database_name
--AND b.backup_start_date = maxb.last_backup_date
and  b.type = 'D'
order by backup_finish_date desc 