USE master 

SELECT 
    DB_NAME(k.database_id) AS DatabaseName
    ,k.encryption_state
    ,encryption_state_desc =
        CASE k.encryption_state
                 WHEN '0'  THEN  'No database encryption key present, no encryption'
                 WHEN '1'  THEN  'Unencrypted'
                 WHEN '2'  THEN  'Encryption in progress'
                 WHEN '3'  THEN  'Encrypted'
                 WHEN '4'  THEN  'Key change in progress'
                 WHEN '5'  THEN  'Decryption in progress'
                 WHEN '6'  THEN  'Protection change in progress (The certificate or asymmetric key that is encrypting the database encryption key is being changed.)'
                 ELSE 'No Status'
         END
    ,k.encryption_scan_state_desc
    ,k.percent_complete
    ,k.encryptor_thumbprint
    ,k.encryptor_type  
FROM sys.dm_database_encryption_keys k;
